en	Storage usage

en	Show usage in percent of default storage

en	Used

en	Free

en	Biggest unused files

en	Displays the 10 biggest files that are not referenced

en	No unused files found

en	Duplicate files

en	Displays all files that are duplicates

en	Open original file in new window

en	Control

en	References

en	Search in folder

en	No duplicates found

en	Last changed pages

en	Displays last changed pages the active backend user has access to

en	Changes in current selected workspace

en	Show history

en	Edit page content

en	Position in pagetree

en	No page history found

en	Latest redirects

en	Shows a list of latest redirects

en	No redirects found

en	Source Domain

en	Source Path

en	Source Target

en	Status Code

en	Hit Count

en	Last Hit

en	Updated ▼

en	Edit Redirect

en	Broken links

en	Shows a list of broken links (based on tx_linkvalidator)

en	Broken link is used in record <strong>%s</strong> (UID: <strong>%s</strong>) on page ID <strong>%s</strong> in field <strong>%s</strong>.

en	No broken links found

en	Error fetching broken links. Please try again.

en	Suppressed Errors

en	This record is in current workspace

en	Needs recheck

en	OK

en	Open in new tab

en	Edit element containing this broken link

en	Suppress error

en	Release error

en	Path

en	Element

en	Link

en	URL / Link Target

en	Error message

en	Last check

en	List of most searched words

en	Last 24 hours, last 30 days and all requests

en	Last 24 hours

en	Last 30 days

en	All

en	Word count

en	Maximum size as bytes or KB, MB, GB: only used to display chart, no validation is done.

en	Open file in new window

en	Display information

en	Search in folder

en	File missing

en	please inform your administrator to run FAL: update storage index