en	Connectors test

en	BE module for testing connector services

en	Debug: Check to turn on debugging to the Dev Log. Debugging also takes place if TYPO3_DLOG is true. Requires devlog or similar extension.

en	Connector Services Sandbox

en	No connector services are available. Please install at least one before trying to use this test module.

en	No service is registered for type %s.

en	None of the installed connector services are available. You should maybe review your setup.

en	One or more connector services are installed but not available: %s.

en	Connector service %s is not available.

en	Choose a connector service (only available services are listed), enter the needed parameters and press the "Test" button:

en	Enter parameters appropriate for the service that you want to test:

en	Choose output format

en	Raw

en	PHP array

en	XML string

en	Test!

en	An error occurred when trying to call the requested service: %1$s (%2$d).

en	The connection test returned no result.

en	Connection test result